Configuring INI Files

The HP OfficeJet Series Configuration program provides an easy method to modify settings in INI files. This program lets you select different options by clicking check boxes.

When you select the OK button, the program updates the appropriate INI files with any changes you have made in the check boxes. After selecting OK, the program will prompt you to either Reboot Windows or Return to Windows. You must reboot windows in order for the changes you have made to take effect.

See the README.TXT file provided on your installation disk for specific information about the INI settings that are modified by the check boxes.

To exit the configuration program without making modifications to any INI file, select the Cancel button.

To set all check boxes to their default settings, select the Default button.

To print this or any other help topic, choose Print Topic from the Help File menu.